ega70-7a

logY Y

log[Y/ΔY] Y_{CIELAB}-Kontrast

N-Schwelle Yu=18log[(Yu/dYu) = ,, mu=,Yu=18, dYu=0,83, Yu/dYu=22

L*= 116 (Y/Y_n)^{1/3} - 16, Y_n=100, Y_u=18, 1 ≤ Y ≤ 100[1g] L*= k_u (Y/Y_u)^{1/3} - 16, k_u=116 [Y_u/Y_n]^{1/3}=65,50 [2g] Y/dY = (3/116) · Y_n^{1/3}Y^{1/3} [3g] Y/dY = e · (Y/Y_n)^{1/3} = f · (Y/Y_u)^{1/3} [4g]

Anwendungsbereich