UE791-3A_1

P40 Range X_{10} Y_{10} Z_{10} x_{10} y_{10} z_{10} L*_{10} a*_{10} b*_{10}

P40 Range X_{10,90} Y_{10,90} Z_{10,90} x_{10,90} y_{10,90} z_{10,90} L*_{10,90} a*_{10,90} b*_{10,90}