DEQ80-7N

Equal 9 step grey scaling between L*0aN=4 and L*0aW=96, Y0ref=90, normalisation: white W L*

50

L*0aN=50, L*0aU=0, L*0aW=0, Y0aN=0, Y0aU=0, Y0aW=0, C0aY=Y0aW:Y0aN=0 L*tN=0, L*taU=, L*taW=, YtaN=, YtaU=, YtaW=, CtaY=YtaW:YtaN= n0. i L*0a L*0r Y0a Y0r L*ta ΔL*ta L*tr Yta (L*tr)1/2 (L*tr)1/2-L*0r

ΔL*ta= (i=1,2,...,9) normalisation: YtaiW=Y0aW

Y0ai+Y0ref Y0aW+Y0ref