DEQ60-3N

Line-element examples for grey samples (0,2≤ x ≤5)

Fu(x) is called the line-element function of fu(x). Both functions are normalized to the surround value:

= fu(x) d[Fu (x)] dx [1] ∫ Fu (x) = f ’u (x) fu (x) dx = ∫ b 1+b x dx [2]

Example for L*(x) & ΔY with x=Y/Yu, xu=1, b=6,141:

L*u (x) = L*(x) L*(xu)

= ln(1+b x) ln(1+b) [3] fu (x) = ΔY ΔYu = 1+b x 1+b [4]