1-003030-L0 XE021-3N

0 0 0 0 0 mean 0 0 0 0 0 standard deviation

Source: BAM Research Report no. 115 (1985), Tables 5.40;1 to 11

Colour stimuli of just noticable colour thresholds (p=50%) in GR direction

number Colour series

CIELAB differences lightness, chroma, Σ ΔL* Δa* Δb* ΔE*ab

LABJND differences lightness, chroma, Σ ΔL* Δa* Δb* ΔE*85 colour differences other formulae CMC C94 C00 notes experimental _GR series