SS401-3A

System: ORS18a

theoretical overprint

real overprint

Hue: h_{ab,D:2013030112000d} = 0/360; h_{ab,D:2013030112000d} = 0/360

Adapted (a) CIELAB (C*ab,a, L*) and relative CIELAB (c*, t*)

triangle lightness t*

relative chroma c*