LE670-7X, Test chart with 1080 standard colours; digital equidistant 9 step hue and achromatic scales;; luminance factor measured: Ym and normalized: Yn = Yw = 100; for low glossy LECD display, Page 1/4; display type: LCED_low_gloss_100828_2