-8 -6 -4 -2 -8 -6 -4 -2

-8 -6 -4 -2 -8 -6 -4 -2

A/IE04/E1-1TS34, DGD3/DGD3.HTM

Prüfvorlage Nr. 1 für Farbkopierer, Vorschlag für ISO 15775/ed-2, siehe

http://standards.iso.org/iso/15775/ed-2/index.html oder http://color.li.tu-berlin.de/DED0/15775.html http://color.li.tu-berlin.de/DGD3/DGD3L0NA.TXT /.PS; Start-Ausgabe

Bestellung bei Produktionsfirma (z.B. Web-site) für ISO-Testvorlage (z.B. Code=rha4ra-G01)

Technische Informationen: (z.B. Web-Seite)

Layout-Dateiversion G1-1TS34

Für Archivseiten nach ISO/IEC 15775:1999, siehe http://color.li.tu-berlin.de/A/IE.HTM

ISO-Identifikation: 20210515-G01

ISO-Referenzmaterial: Code=rha4ra-G01

Ähnliche Dateien für die Displayausgabe: http://standards.iso.org/iso/9241/306/ed-2/index.html