DEP71-6A

Munsell System, Y_w=100, klaus.richter@mac.com C=2, V=1, 2, 5, 8 & 9, image reproduction, colour devices chromatic value (A_4, B_4)

X_w=96,79, Y_w=100,00, Z_w=111,46 x_w=0,3140 y_w=0,3244 A_4=(a_4-[a_{4,n}+a_{4,A}+a_{4,Y}]) Y B_4=(b_4-[b_{4,n}+b_{4,A}+b_{4,Y}]) Y

n = goto: http://farbe.li.tu-berlin.de or http://color.li.tu-berlin.de a_{4,Y}=a_{2Y}(Y/Y_{18}-1) b_{4,Y}=b_{2Y}(Y/Y_{18}-1) a_{2Y}=-0,013, b_{2Y}=0,008 a_{4,A}=0,000, b_{4,A}=0,000 a_4 = a_{20} [(x-0,171)/y] b_4=b_{20} [(m_{P1}x+b_{P1})/y] a_{20} = 1, b_{20} = -0,4 m_{P1}=1,000, b_{P1}=0,000

compare K. Richter "Computergrafik ...": ISBN 3-8007-1775-1