-8 -6 -4 -2 -8 -6 -4 -2

-8 -6 -4 -2 -8 -6 -4 -2

A/IE04/E2-4CS34, DEE1/DEE1.HTM

Test chart no. 4 for color copiers, proposal for ISO 15775/ed-2, see

http://standards.iso.org/iso/15775/ed-2/index.html or http://color.li.tu-berlin.de/DED0/15775.html http://color.li.tu-berlin.de/DEE1/DEE1L0N1.TXT /.PS; start output

Order information of production company (e.g. Web-site) for ISO-test chart (e.g. code=rha4ra-I04)

Technical informations: (e.g. Web-site)

Layout-file version E2-4CS34

For archive files according to ISO/IEC 15775:1999, see http://color.li.tu-berlin.de/A/IE.HTM

ISO identification: 20210515-I04

ISO-reference material: code=rha4ra-I04

For similar files for the display output: http://standards.iso.org/iso/9241/306/ed-2/index.html