AEY11-2N

Input - Output Relationship between 16 step equally spaced samples in L* and rgb data

Input

Output

L* Lightness N to W N_h Number grey sample

N_v8bit

The ergonomic relation is dashed black. linearized rgb data

rgb data of Photo CD

negative film (nf) exposure -2,0 stops